\nonstopmode
\usepackage[document]{ragged2e}
\usepackage{xeCJK}
\usepackage{graphicx}
\parindent 2em
\setcounter{tocdepth}{3}
\renewcommand\familydefault{\ttdefault}
\renewcommand\CJKfamilydefault{\CJKrmdefault}
\usepackage{graphicx}
\usepackage{tocloft}
\renewcommand\cftfignumwidth{4em}
\renewcommand\cfttabnumwidth{4em}
\renewcommand\cftsecnumwidth{4em}
\renewcommand\cftsubsecnumwidth{6em}
\renewcommand\cftparanumwidth{6em}
\newcommand{\sectionbreak}{\clearpage}
\usepackage{hyperref}
\usepackage{xcolor}
\definecolor{linkcolorSet}{RGB}{0, 76, 155}
\hypersetup{
  colorlinks=true,
  linkcolor=linkcolorSet,
  filecolor=magenta,
  urlcolor=blue,
  citecolor=black,
  breaklinks=true,
  plainpages=false,
  pdfpagelabels=true,
  pdfstartpage=1,
  pdfpagemode=None,
  pdfborder={0 0 0},
  backref=true
}
\usepackage{geometry}
\geometry{
    a4paper,
    left=25mm,
    right=25mm,
    top=25mm,
    bottom=25mm,
}
\usepackage{longtable}
\usepackage{booktabs}
\setlength{\tabcolsep}{5pt}
